DROP TABLE IF EXISTS "public"."iot_thing_static_dict";
CREATE TABLE "public"."iot_thing_static_dict" (
      "id" INT8 NOT NULL,
      "entity_id" INT8 NOT NULL,
      "name" VARCHAR ( 255 ) COLLATE "pg_catalog"."default" NOT NULL,
      "code" VARCHAR ( 255 ) COLLATE "pg_catalog"."default" NOT NULL,
      "type" VARCHAR ( 255 ) COLLATE "pg_catalog"."default" NOT NULL,
      "ts" INT8,
      "val" VARCHAR ( 1000 ) COLLATE "pg_catalog"."default",
      "creator" INT8,
      "create_date" INT8,
      "updater" INT8,
      "update_date" INT8,
      "unit" VARCHAR ( 255 ) COLLATE "pg_catalog"."default",
      "group" VARCHAR ( 255 ) COLLATE "pg_catalog"."default",
      "tenant_code" INT8,
      "company_id" INT8,
      "dept_id" INT8,
      CONSTRAINT "iot_thing_static_dict_pkey" PRIMARY KEY ( "id" )
);
ALTER TABLE "public"."iot_thing_static_dict" OWNER TO "postgres";
COMMENT ON COLUMN "public"."iot_thing_static_dict"."entity_id" IS '物实体id';
COMMENT ON COLUMN "public"."iot_thing_static_dict"."name" IS '属性名称';
COMMENT ON COLUMN "public"."iot_thing_static_dict"."code" IS '属性编码';
COMMENT ON COLUMN "public"."iot_thing_static_dict"."type" IS '属性类型';
COMMENT ON COLUMN "public"."iot_thing_static_dict"."ts" IS '时间戳';
COMMENT ON COLUMN "public"."iot_thing_static_dict"."val" IS '值';
COMMENT ON COLUMN "public"."iot_thing_static_dict"."unit" IS '单位';